MISCELLANEOUS                         CHANGING PAGE DISPLAY (TOGGLES)
?  Display this command help info     T  Terse - fast but inaccurate
S  Show options, fonts and page info  B  Bounding Box of glyphs
A  Toggle Auto window                 F  Full - accurate but slow
Q  Quit from dvgt                     
                                      CHANGING UNITS OF DIMENSIONS
                                      C u  Where u is one of the units
SELECTING A PAGE                      BP, CM, IN, MM, PC, PT, PX, or SP
[i0. ... .i9]  Select TeX page        (big point, cm, inch, mm, pica,
i  Select the ith DVI page            point, paper pixel, or scaled point)
N  Next DVI page
P  Previous DVI page                  MOVING THE WINDOW
                                      W h,v  Move Window to given posn
CHANGING THE SIZE OF THE WINDOW              or to (minh,minv) if no h,v
H x   Set Horiz. window size to x     U v    Move window Up by v
      or to unscaled width if no x           or by current ht if no v
V y   Set Vertical window size to y   D v    Move window Down by v
      or to unscaled height if no y          or by current ht if no v
ZI z  Zoom In by factor z             L h    Move window Left by h
      or by current factor if no z           or by cur. width if no h
ZO z  Zoom Out, as for ZI             R h    Move window Right by h
ZCI z, ZCO z  Zoom wrt window centre         or by current width if no h
