128.145.120.0128.145.50.0128.145.10.0CC254.2254.1192.12.82.0192.5.43.0129.236.0.0128.145.40.0BNL192.12.15.024212128.145.110.0Other RoutersBCHPU?BBNCiscoNon-UNIX HostProteonUNIX HostUnknownLine Types and SpeedsDS1, T1, 1.34Mb/sDS0, Cu, 56Kb/sSR, 9.6Kb/sUnknown Type and SpeedEthernet or IEEE802.3, 10Mb/sRing (Unknown Speed)Router Hardware (shape)Proteon p4100Proteon p4200-10Proteon p4200-20Cisco CSC2Router Software (fill)Proteon p5600 8.0Proteon p5600 8.1Proteon p5600 8.2Cisco 7.0 (15)Kodak129.126.5.070132C129.126.13.0128.145.8.0Buffalo123UH128.205.0.01.12.21.3HU129.3.0.01.31192.31.254.0SUNY OswegoAlfred University12NetworksARPANetABITNET 2BJVNCNetJNSFNet 2NMILNetMNYSERNet 2*OOntario Regional Network1cayuga.cs.rochester.educsee.cc.rochester.edu11B10.4.0.15U10.0.0.15128.151.0.0128.145.203.0192.5.53.0209128.2128.1128.513A12456RochesterARPAPSN 1510.2.0.15Udevvax.tn.cornell.eduP?192.35.82.012200238128.253.0.0128.84.0.010075NYNEX128.209.0.0114.4212pc2Other Symbols*RCI OwnedpcBoot PCP123Rev. 6.0Revision Date: 2/2/89

128.145.130.0128.145.150.0128.145.1.0128.145.20.0128.145.100.0128.145.90.0128.145.5.0128.145.3.0128.145.185.0128.145.60.0128.145.175.0128.145.30.0128.145.80.01254.3128.59.0.0Columbia1764531121128.145.160.01RPI128.113.0.01.11222123456Albany128.204.0.01.1212RADC192.43.152.01212Clarkson128.153.0.04.1212Syracuse128.230.0.01211.191235Stony Brook129.49.0.02.1221128.145.170.0192.35.44.012PGeneral Electric CRDNISC192.33.4.01112NYSERNet NISCBinghamton123128.226.0.01.1212Rockefeller3124129.85.0.0UH192.5.237.01.2541.19Smith Kline French1Polytechnic128.238.0.02.102211Cornell112devvax.tn.cornell.eduP128.145.198.02112UN100NSS 10n2ngw.nyser.net123456UO75CUNY128.228.0.01.1B146211C3NYU22128.122.0.0UJUegress.nyu.edujvncb.csc.org1128.145.254.0128.44128.241212345pc